起動方法

3dfx ToolsコントロールアプレットはWindowsのコントロールパネルからアクセスできます。

1	Windowsの [スタート] ボタンをクリックし、[設定] から [コントロールパネル] をクリックします。

2	[3dfx Tools] アイコンをダブルクリックします。


ヘルプの使い方

オンラインヘルプが用意されており、3dfx Toolsコントロールページ内で<F1キー>を押すとオンラインヘルプにアクセスできます。ここには3dfx Toolsの制御に関する一般的なヘルプ情報が掲載されています。

詳細なヘルプ情報は、オンラインヘルプ内からアクセスできます。あるいは、3dfx Toolsコントロールアプレット内で [ヘルプ] ボタンをクリックしてもアクセスできます。ここには3dfx Toolsについての詳しい情報が掲載されています。


特定のツールについて

それぞれのツールごとにオンラインヘルプが用意されており、ツールのコントロールページ内で<F1>キーを押すとオンラインヘルプにアクセスできます。ここには現在のページについてのヘルプ情報が掲載されています。


3dfx Toolsの削除

システムから3dfx Toolsを削除するには次の手順に従います。

1	すべてのプログラムを閉じます。

2	Windowsの [スタート] ボタンをクリックし、[設定] から [コントロールパネル] をクリックします。

3	[アプリケーションの追加と削除] アイコンをダブルクリックします。

4	画面の指示に従います。

5	3dfx Toolsの削除を完了するには、システムの再起動が必要です。


3dfx Toolsのコントロールページ

次の図に3dfx Toolsのコントロールページ全体を示します。

コントロールページには現在インストールされているすべてのツールの一覧が表示され、ユーザは必要に応じてこれらのツールを有効／無効にできます。

複数のグラフィックス アクセラレータがインストールされている場合、特定のカードにツールを使用可能または使用不能にすることができます。


ツールを有効／無効にする方法

ツールを有効／無効にするには次の手順に従います。

1	ツールを使用可能または使用不能にしたいグラフィックス アクセラレータを選択してください。

2	必要に応じてツールのチェックボックスをオンまたはオフにします。

3	この変更を適用するには、[適用] または [OK] ボタンをクリックします。

変更を取り消したい場合は、[キャンセル] をクリックします。

無効にしたツールのコントロールパネルは、3dfx Toolsコントロールアプレットや詳細設定ページに表示されません。


3dfx Toolsのバージョン情報

3dfx Toolsコントロールアプレットのタイトルバーを左クリックし、[3dfx Toolsのバージョン情報] を選択すると、3dfx Toolsのバージョン情報ボックスが表示されます。

ここにはバージョン情報が掲載されています。